\begin{thebibliography}{10}

\bibitem{Fink:ACW:1989}
A.~Finkelstein, M.~Goedicke, J.~Kramer, and C.~Niskier, ``{ViewPoint} oriented
  software development: {Methods} and viewpoints in requirements engineering,''
  in {\em Proceedings of the Second Meteor Workshop on Methods for Formal
  Specification} (J.~Bergstra and L.~Feijs, eds.), vol.~490 of {\em Lecture
  Notes in Computer Science}, (Mierlo, The Netherlands), pp.~29--54,
  Springer-Verlag, Sept. 1989.

\bibitem{Rumb:J:1999:UML}
J.~Rumbaugh, I.~Jacobson, and G.~Booch, {\em The Unified Modeling Language
  Reference Manual}.
\newblock Reading, Massachusetts: Addison-Wesley, 1999.

\bibitem{Stan:N:1999:PhD}
N.~Stanger, {\em Using Multiple Representations Within a Viewpoint}.
\newblock {PhD} thesis, Department of Information Science, University of Otago,
  Dunedin, New Zealand, Dec. 1999.

\bibitem{Pasc:RT:1990}
R.~Pascoe and J.~Penny, ``Construction of interfaces for the exchange of
  geographic data,'' {\em International Journal of Geographical Information
  Systems}, vol.~4, no.~2, pp.~147--156, 1990.

\bibitem{East:SM:1991:PhD}
S.~M. Easterbrook, {\em Elicitation of Requirements from Multiple
  Perspectives}.
\newblock {PhD} thesis, Imperial College of Science Technology and Medicine,
  University of London, London, 1991.

\bibitem{Stan:N:1997:ECIS97}
N.~Stanger and R.~Pascoe, ``Environments for viewpoint representations,'' in
  {\em Proceedings of the Fifth European Conference on Information Systems
  (ECIS'97)} (R.~Galliers, S.~Carlsson, C.~Loebbecke, C.~Murphy, H.~Hansen, and
  R.~O'Callaghan, eds.), vol.~I, (Cork, Ireland), pp.~367--382, Cork
  Publishing, June~19--21 1997.

\bibitem{Stan:N:2000:dp2000-09}
N.~Stanger, ``A viewpoint-based framework for discussing the use of multiple
  modelling representations,'' Discussion Paper 2000/09, Department of
  Information Science, University of Otago, Dunedin, New Zealand, Apr. 2000.

\bibitem{Dark:P:1996:RE}
P.~Darke and G.~Shanks, ``Stakeholder viewpoints in requirements definition:
  {A} framework for understanding viewpoint development approaches,'' {\em
  Requirements Engineering}, vol.~1, pp.~88--105, 1996.

\bibitem{Pasc:RT:1995}
R.~T. Pascoe and J.~P. Penny, ``Constructing interfaces between (and within)
  geographical information systems,'' {\em International Journal of
  Geographical Information Systems}, vol.~9, no.~3, pp.~275--291, 1995.

\bibitem{Mart:J:1990:IE2}
J.~Martin, {\em Information Engineering, Book {II}: Planning and Analysis}.
\newblock Englewood Cliffs, New Jersey: Prentice-Hall, revised~ed., 1990.

\bibitem{Atze:P:1995:Lattice}
P.~Atzeni and R.~Torlone, ``Schema translation between heterogeneous data
  models in a lattice framework,'' in {\em Database Applications Semantics,
  Proceedings of the Sixth IFIP TC-2 Working Conference on Data Semantics
  (DS-6)} (R.~Meersman and L.~Mark, eds.), (Stone Mountain, Atlanta, Georgia),
  pp.~345--361, Chapman \& Hall, May~30--June~2 1995.

\bibitem{Atze:P:1996:EDBT}
P.~Atzeni and R.~Torlone, ``Management of multiple models in an extensible
  database design tool,'' in {\em Proceedings of the Fifth International
  Conference on Extending Database Technology (EDBT'96)} (P.~Apers,
  M.~Bouzeghoub, and G.~Gardarin, eds.), vol.~1057 of {\em Lecture Notes in
  Computer Science}, (Avignon, France), pp.~79--95, Springer-Verlag,
  Mar.~25--29 1996.

\bibitem{Amor:R:1997:PhD}
R.~W. Amor, {\em A Generalised Framework for the Design and Construction of
  Integrated Design Systems}.
\newblock {PhD} thesis, Department of Computer Science, University of Auckland,
  Auckland, New Zealand, May 1997.

\bibitem{Smit:HC:1985}
H.~C. Smith, ``Database design: {Composing} fully normalized tables from a
  rigorous dependency diagram,'' {\em Communications of the ACM}, vol.~28,
  no.~8, pp.~826--838, 1985.

\bibitem{Stan:N:1999:Smith}
N.~Stanger, ``Modifications to {Smith's} method for deriving normalised
  relations from a functional dependency diagram,'' Discussion Paper 99/23,
  Department of Information Science, University of Otago, Dunedin, New Zealand,
  Dec. 1999.

\bibitem{Stan:N:1997:APSEC97}
N.~Stanger and R.~Pascoe, ``Exploiting the advantages of object-oriented
  programming in the implementation of a database design environment,'' in {\em
  Proceedings of the Joint 1997 Asia Pacific Software Engineering Conference
  and International Computer Science Conference (APSEC'97/ICSC'97)}, (Hong
  Kong), IEEE Press, Dec.~2--5 1997.

\bibitem{Stan:N:1997:dp9708}
N.~Stanger and R.~Pascoe, ``Exploiting the advantages of object-oriented
  programming in the implementation of a database design environment,''
  Discussion Paper 97/08, Department of Information Science, University of
  Otago, Dunedin, New Zealand, 1997.

\bibitem{Su:SYW:1993}
S.~Su and S.~Fang, ``A neutral semantic representation for data model and
  schema translation,'' Technical report TR-93-023, University of Florida,
  Gainesville, Florida, July 1993.

\bibitem{Hull:R:1986:SIAM}
R.~Hull, ``Relative information capacity of simple relational database
  schemata,'' {\em {SIAM} Journal on Computing}, vol.~15, pp.~856--886, Aug.
  1986.

\bibitem{Mill:RJ:1994:CS-TR-94-1185}
R.~Miller, Y.~Ioannidis, and R.~Ramakrishnan, ``Schema intension graphs: {A}
  formal model for the study of schema equivalence,'' Technical report
  CS-TR-94-1185, Department of Computer Sciences, University of
  Wisconsin-Madison, Madison, Wisconsin, Jan. 1994.

\bibitem{Mill:RJ:1994:IS19-1}
R.~Miller, Y.~Ioannidis, and R.~Ramakrishnan, ``Schema equivalence in
  heterogeneous systems: {Bridging} theory and practice,'' {\em Information
  Systems}, vol.~19, no.~1, pp.~3--31, 1994.

\bibitem{Mill:RJ:1994:PhD}
R.~Miller, {\em Managing Structural Heterogeneity}.
\newblock {PhD} thesis, Department of Computer Sciences, University of
  Wisconsin-Madison, Madison, Wisconsin, 1994.

\end{thebibliography}
